      *   Last change:  WK   21 Apr 98    4:44 pm
[Projections]
Azimuthal Equidistant=
Aitoff=
Albers EqualArea Conic=
Bonne=
Cassini=
Central Cylindrical=
DutchRD=Double Projection of Schreiber, stereographic projection for The Netherlands
Eckert1=
Eckert2=
Eckert3=
EOV Hungary=Hungarian EOV (Uniform National Projection)
Equidistant Conic=
Gauss-Boaga Italy=Transverse Mercator Projection for Italy with 2 Zones
Gauss Colombia=Tranverse Mercator Projection for Colombia with 4 Zones
Gauss-Krueger Germany=Transverse Mercator Projection for Germany with 3 Zones
General Perspective=
GeoStationary Satellite=
GeoStationary Satellite View (PROJ4)=
Gnomonic=
Goode=
Goode Interrupted=
Hammer Aitoff=
Lambert Azimuthal EqualArea=
Lambert Conformal Conic=
Lambert Conform Conic Belgium 1972=Conical Projection of Belgium 1972 with 2 St Parallels
Lambert Conform Conic Belgium 2008=Conical Projection of Belgium 2008 with 2 St Parallels 
Lambert Conform Conic France=Conical Projection of France with 4 Zones 
Lambert Cylind EqualArea=
Mercator=
Mercator Scaled=
Miller=
Mollweide=
MSG Perspective=
New Zealand Map Grid=Projection for New Zealand since 1972
Oblique Mercator=
Orthographic=
Plate Carree=
Plate Rectangle=
PolyConic=
Robinson=
Sinusoidal=
Sinusoidal Interrupted=
Sinusoidal 2 x Interrupted=
Sinusoidal 3 x Interrupted=
StereoGraphic=
Transverse Mercator=
UPS=
UTM=
VanderGrinten=
VanHuut=
Vertical Perspective=
Wagner VII=
Winkel I=
Winkel Triple=
